INSERT INTO `z3950servers`
(`host`, `port`, `db`, `userid`, `password`, `servername`, `id`, `checked`, `rank`, `syntax`, `servertype`, `encoding`) VALUES
('z3950.bnf.fr', 2211, 'TOUT-UTF8', 'Z3950', 'Z3950_BNF', 'BNF2', 2, 1, 2, 'UNIMARC', 'zed', 'utf8');
