SET FOREIGN_KEY_CHECKS=0;

INSERT INTO `currency` (currency, rate, symbol) VALUES
('USD', 1.4, '$'),
('GBP', .8, '£'),
('EUR', 1, '€');

SET FOREIGN_KEY_CHECKS=1;
